η

0

10000

20000

30000

40000

50000

[pb/rad] η/dσd

CMS

7000 GeV pp bb

mcplots.cern.ch [arXiv:1306.3436]

(CMS_2016_I1486238)

(b-jet) (cms2016-2b2j) η

2− 1− 0 1 2 η

1

Ratio to CMS

2

0.5

2

0.5

1