between two B hadrons {R} Δ

2−10

1−10

1

10

210

310

410

510

[pb] {R} Δ / d σd

CMS Pythia 6.428 370 Pythia 6.428 391 Pythia 6.428 default Pythia 8.170 default

7000 GeV pp bb

mcplots.cern.ch [arXiv:1306.3436] 400k events≥

Rivet 3.1.10,

CMS_2011_S8973270

| <3)

Jlead η > 84 GeV, |

Jlead

(b-jets) (pT RΔ

0 1 2 3 4 between two B hadrons {R} Δ

1

Ratio to CMS

2

0.5

2

0.5

1