η Muon

0

200

400

600

800

1000 mu + X’) [nb/GeV] → b + X → (pp η/dσd

CMS Herwig++ 2.6.3 default Herwig 7.2.1 default Sherpa 2.2.9 default

7000 GeV pp bb

mcplots.cern.ch [arXiv:1306.3436] 400k events≥

Rivet 3.1.10,

CMS_2011_S8941262

> 6 GeV) μ (pT ^lη

2− 1− 0 1 2 η Muon

1

Ratio to CMS

2

0.5

2

0.5

1