[GeV] sqrt{s}

0

0.5

1

1.5

2

2.5

3

3.5 b]μ mu + X’) [ → b + X → (pp σ

CMS Pythia 6.428 345 Pythia 6.428 346 Pythia 6.428 370 Pythia 6.428 default Pythia 8.180 default

7000 GeV pp bb

mcplots.cern.ch [arXiv:1306.3436] 300k events≥

Rivet 3.1.10,

CMS_2011_S8941262

2.1) η (cms2011-mu-pt6-

Cross section

6999.5 7000 7000.5 [GeV] sqrt{s}

1

Ratio to CMS

2

0.5

2

0.5

1