23y

3−10

≥ Rivet 4.1.0,

(OPAL_2004_I669402)

, at 133 GeV 23 3 transition parameter, y → Durham jet 2

0 0.1 0.2 0.3 23y

1

Ratio to OPAL

2

0.5

2

0.5

1