[GeV]

}_{12} sqrt{d

0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

]^{-1} [GeV

}_{12} /dsqrt{d σ dσ1/

ATLAS Herwig++ 2.4.2 default Herwig 7.2.1 default Herwig 7.2.1 softTune

7000 GeV pp Jets

mcplots.cern.ch [arXiv:1306.3436] 400k events≥

Rivet 3.1.10,

ATLAS_2012_I1094564

< 500, |y| < 2.0) T (1.0), 400< p T (anti-k 12d Splitting scale

0 50 100 [GeV]

}_{12} sqrt{d

1

Ratio to ATLAS

2

0.5

2

0.5

1