[rad] ϕΔ

3−10

2−10

1−10

1

10

210

]^{-1} [rad ϕΔd σd σ 1

CMS Herwig++ 2.7.1 default Herwig 7.2.1 default

7000 GeV pp Jets

mcplots.cern.ch [arXiv:1306.3436] 2.8M events ≥ Rivet 3.1.10,

CMS_2011_S8950903

(jj) (300 < pTlead) ϕΔ

2 2.5 3 [rad] ϕΔ

1

Ratio to CMS

2

0.5

2

0.5

1