[deg] 12ϕΔ

0

Rivet 3.1.10,

CMS_2019_I1719955

(jj) (CMS back-to-back jets) ϕΔ

170 175 180 [deg] 12ϕΔ

1

Ratio to CMS

2

0.5

2

0.5

1