(m_1 + m_2) / 2 [GeV]

8−10

<500, |y|<2.5) T (0.7), 2450<p T (anti-k

Filtered dijet mass

0 50 100 150 200 (m_1 + m_2) / 2 [GeV]

1

Ratio to CMS

2

0.5

2

0.5

1