[GeV!/!c] Tp

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210 310 410 b/(GeV!/!c)] μ [_T / dp σd

LHCB Herwig++ 2.5.0 default Herwig 7.2.1 default

7000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:1306.3436] 400k events≥

Rivet 3.1.10,

LHCB_2013_I1218996

) (y-3.0-3.5) 0(D pT

0 2 4 6 8 [GeV!/!c] Tp

1

Ratio to LHCB

2

0.5

2

0.5

1