chN

0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

[GeV]

〉 _T p〈

CMS Pythia 8.212 default Pythia 8.212 tune-A14-CTEQL1 Pythia 8.212 tune-A14-MSTW2008LO Pythia 8.212 tune-A14-NNPDF2.3LO Pythia 8.212 tune-CUETP8S1

7000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:1306.3436] 300k events≥

Rivet 3.1.10,

CMS_2013_I1261026

|<2.4, all charged particles) chη >0.25, | ch T(p _{ch} vs N T Average p

0 50 100 chN

1

Ratio to CMS

2

0.5

2

0.5

1