]^2

|t| [GeV

1

10

210

]^2 [mb/GeV d |t| σd

ATLAS Pythia 6.424 default Pythia 6.424 pro-q2o

8000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:1306.3436] 300k events≥

Rivet 3.1.10,

ATLAS_2019_I1762584

(ATLAS)

|t|

0 0.1 0.2 0.3 0.4 ]^2

|t| [GeV

1

Ratio to ATLAS

2

0.5

2

0.5

1