[GeV] sqrt{s}

40

60

80

100

120

[mb]

inelσ

ATLAS Herwig 7.2.1 default Pythia 8.201 default

7000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:1306.3436] 400k events≥

Rivet 3.1.10,

ATLAS_2011_I894867

)^{-6}

>5x10 ξ( Cross section

6999.5 7000 7000.5 [GeV] sqrt{s}

1

Ratio to ATLAS

2

0.5

2

0.5

1