η

0.5

1

1.5

2

2.5

3

3.5 η/d_{ch} dN

UA5 Pythia 6.427 345 Pythia 6.427 346 Pythia 6.427 370 Pythia 6.427 default Pythia 8.308 default

900 GeV ppbar NSD

mcplots.cern.ch [arXiv:1306.3436] 200k events≥

Rivet 3.1.10,

UA5_1986_S1583476

(ua5-900-nsd2)

Distribution η Charged Particle

0 1 2 3 4 η

1

Ratio to UA5

2

0.5

2

0.5

1