[GeV] Tp

7−10

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210 310 410 510 610 710 dy [pb/GeV] T /dp σ^2d

CMS Pythia 6.427 370 Pythia 6.427 default Pythia 6.427 pro-q2o

13000 GeV pp Jets

mcplots.cern.ch [arXiv:2401.10621] 100k events≥

Rivet 4.1.0,

(CMS_2021_I1972986)

CMS, #sqrt(s) = 13 TeV, Inclusive AK7 jets, 0.0 < |y| < 0.5

0 1000 2000 3000 [GeV] Tp

1

Ratio to CMS

2

0.5

2

0.5

1