|y_1-y_2| = e } {dijet χ

jj CMS, 13 TeV, |y_1+y_2|/2<1.11 2.4 TeV <M

0 5 10 15_{|y_1-y_2|} = e } {dijet χ

1

Ratio to CMS

2

0.5

2

0.5

1