[GeV] Tp

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

+ cΛ)/

0,+,++ cΣ (arrow + cΛ

ALICE

Pythia 8.307 pptherm

13000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:2401.10621] Rivet 4.1.0, 400k events

(ALICE_2022_I1868463)

+ cΛ and

0,+,++ cΣ from + cΛ Average ratio of

5 10 [GeV] Tp

1

Ratio to ALICE

2

0.5

2

0.5

1