Electromagnetic energy [GeV]

2−10

1−10

1

10

210

310

410 b/GeV] μ /dE[ σd

CMS Epos 1.99.crmc.1.6.0 lhc Herwig 7.2.1 default Pythia 6.428 370 Pythia 8.315 default Sherpa 2.2.9 default

13000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:2401.10621] 400k events≥

Rivet 4.1.0,

(CMS_2017_I1511284)

< -5.2) η CMS, 13 TeV, Electromagnetic energy spectrum (-6.6 <

0 500 1000 1500 2000 Electromagnetic energy [GeV]

1

Ratio to CMS

2

0.5

2

0.5

1