] # [{TeV} t}_{{T}p

1−10

1

10

210

]^{-1} # [{TeV} t}_{{T} / d p σ # #cdot # d σ 1 /

ATLAS Pythia 8.315 default Pythia 8.315 tune-4c Pythia 8.315 tune-4cx

13000 GeV pp tt