)|_h

|y({t}

0

0.01

0.02

0.03

0.04

0.05

0.06

0.07

]^{-1} {GeV}

[{pb} )|}_h ) d|y({t} h ({t_T d p σ^2d #

CMS Pythia 8.315 default

Pythia 8.315 tune-2c

Pythia 8.315 tune-2m

13000 GeV pp t