)_h,t_1(jπ ϕΔ #

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

) [pb] j ) / d N h,t_1(jπ ϕΔ / (d # σd

ATLAS Herwig 7.2.1 default Pythia 8.135 default

13000 GeV pp tt

mcplots.cern.ch [arXiv:2401.10621]