)|}t{

|y({t}

4−10_{(CMS_2021_I1901295)}

) < 1000 GeV }t{ : 800 < m({t}

+{jets} μ e/}t{

CMS, 13 TeV, {t}

0 1 2 )|}t{

|y({t}

1

Ratio to CMS

2

0.5

2

0.5

1