[GeV]

lead Tp

4−10

3−10

2−10

1−10

1

10

]^{-1} [{GeV}

lead T /dp ev # d N ev 1/N

ATLAS Pythia 6.428 370 Pythia 6.428 373 Pythia 6.428 374 Pythia 6.428 375 Pythia 6.428 381 Pythia 6.428 382

13000 GeV pp Underlying Event

mcplots.cern.ch [arXiv:2401.10621] 2.6M events ≥ Rivet 4.1.0,

(ATLAS_2017_I1509919)

> {5 GeV}

lead

T, p

lead T Unit-normalised distribution of p

10 20 30 [GeV]

lead Tp

1

Ratio to ATLAS

2

0.5

2

0.5

1