η * ϕ

3−10

2−10

1−10

1

10

210

310

[pb] η * ϕ/dσd

CMS Herwig 7.2.1 softTune Pythia 8.315 default

13000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:2401.10621] 2.5M events ≥ Rivet 4.1.0,

(CMS_2022_I2079374)

<350 GeV

#ell#ell

, 170<m - #ell + #ell

→ ^*γ/

CMS, 13 TeV, {Z}

0 1 2 3 η * ϕ

1

Ratio to CMS

2

0.5

2

0.5

1