[GeV] Z Tp

2−10

1−10

1

10

[pb/(GeV)] Z Tdp^Zdy 2σd #

LHCB Pythia 8.315 default Pythia 8.315 tune-AU2 Pythia 8.315 tune-AU2lox Pythia 8.315 tune-AU2loxx Pythia 8.315 tune-AU2m

13000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:2401.10621] 2.6M events ≥ Rivet 4.1.0,

(LHCB_2021_I1990313)

< 2.5 Z Double differential cross-section for 2.0 < y

0 100 200 [GeV] Z Tp

1

Ratio to LHCB

2

0.5

2

0.5

1