n

8−10

7−10

6−10

5−10

4−10

3−10

2−10

1−10 1 10 nP

CMS Pythia 6.428 345 Pythia 6.428 346 Pythia 6.428 370 Pythia 6.428 default Pythia 8.186 default

2360 GeV pp NSD

mcplots.cern.ch [arXiv:2401.10621]