yΔ

0

0.5

1

1.5

2

2.5

3

3.5

4

veto MN R

CMS Pythia 6.425 ambt1 Pythia 6.425 z1 Pythia 6.425 z2

2760 GeV pp Jets

mcplots.cern.ch [arXiv:2401.10621] 300k events≥

Rivet 4.1.0,

(CMS_2021_I1963239)

, Figure 7

veto MN CMS, pp 2.76 TeV, Ratio R

0 2 4 6 8 yΔ

1

Ratio to CMS

2

0.5

2

0.5

1