[GeV] s

0

0.5

1

1.5

2

2.5

3

3.5 b]μ + X’) [ μ→ b + X → (pp σ

CMS Pythia 6.427 370 Pythia 6.427 default Pythia 6.427 pro-q2o

7000 GeV pp bb

mcplots.cern.ch [arXiv:2401.10621] 100k events≥

Rivet 4.1.0,

(CMS_2011_I884811)

mu| < 2.1 #η mu > 6 GeV, | # T Inclusive b-hadron production with muons, p

6999.5 7000 7000.5 [GeV] s

1

Ratio to CMS

2

0.5

2

0.5

1