} {dijet χ

0.04

0.06

0.08

0.1

0.12

0.14

} {dijet

χ/d}

{dijet

σ d}

{dijet σ1/

CMS Pythia 6.426 default Pythia 6.426 pro-q2o

7000 GeV pp Jets

mcplots.cern.ch [arXiv:2401.10621] 400k events≥

Rivet 4.1.0,

(CMS_2011_I889175)

= 7 {TeV} s , |y_1+y_2|/2 < 1.11,

< 1.4 {TeV} jj <M for 1.1 {TeV} } {dijet χ

0 5 10 15 } {dijet χ

1

Ratio to CMS

2

0.5

2

0.5

1