dijet χ

300k events ≥ Rivet 4.1.0,

(CMS_2012_I1090423)

= 7 {TeV} s , |y_1+y_2|/2 < 1.11,

< 3.0 {TeV} jj < M for 2.4 {TeV}

dijet χ

0 5 10 15

dijet χ

1

Ratio to CMS

2

0.5

2

0.5

1