[GeV] 12m

1

10

210

310

(ATLAS_2010_I871366)

|<0.8. anti-KT, R=0.6. max Dijet mass spectrum for 0.3<|y

200 400 600 [GeV] 12m

1

Ratio to ATLAS

2

0.5

2

0.5

1