|_{μμ}ηΔ|

0 0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

[pb/GeV] μμηΔ d_{μμ} d m σ^2d #

ATLAS Pythia 6.427 370 Pythia 6.427 379 Pythia 6.427 ambt1 Pythia 6.427 z2

8000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:2401.10621] 500k events≥

Rivet 4.1.0,

(ATLAS_2016_I1467454)

< 300 GeV μμ 200 GeV < m

0 1 2 3 |_{μμ}ηΔ|

1

Ratio to ATLAS

2

0.5

2

0.5

1