sqrt{s}

60

80

100

120

140

160

180

[mb]

total σ

TOTEM Pythia 6.428 390 Pythia 6.428 391 Pythia 6.428 392 Pythia 6.428 396 Pythia 6.428 397 Pythia 6.428 398

7000 GeV pp_{Total}σ

mcplots.cern.ch [arXiv:1306.3436] 2.6M events ≥ Rivet 3.1.10,

(TOTEM_2011_I930960)

6999.5 7000 7000.5 sqrt{s}

1

Ratio to TOTEM

2

0.5

2

0.5

1