| tright

left|y Δ

0

0.2

0.4

0.6

0.8

1

1.2

| tright

left|y Δd σd σ 1

CMS Pythia 6.426 350 Pythia 6.426 351 Pythia 6.426 352 Pythia 6.426 353 Pythia 6.426 354 Pythia 6.426 355 Pythia 6.426 356 Pythia 6.426 357 Pythia 6.426 358 Pythia 6.426 359

8000 GeV pp tt

mcplots.cern.ch [arXiv:1306.3436] 300k events≥

Rivet 3.1.10,

CMS_2016_I1430892

parton level information) events,

(ttbar) (tt yΔ

2− 1− 0 1 2 | tright

left|y Δ

1

Ratio to CMS

2

0.5

2

0.5

1