/ degrees ϕΔ

400k events ≥ Rivet 3.1.10,

CDF_2001_S4751469

> 2.0 GeV) Tj1 (p ^{lead} ϕ > vs ch <N

0 50 100 150 / degrees ϕΔ

1

Ratio to CDF

2

0.5

2

0.5

1