/ GeV Tp

5−10

4−10

3−10

2−10

1−10

1

10

210

T /dp σ dσ1/

CDF

1800 GeV ppbar Underlying Event

mcplots.cern.ch [arXiv:1306.3436]

(CDF_2001_S4751469)

> 30.0 GeV) Tj1 (p spectrum Tp

0 5 10 / GeV Tp

1

Ratio to CDF

2

0.5

2

0.5

1