[GeV] T sum p

4−10

≥ Rivet 3.1.10,

CMS_2011_S9120041

) (pT > 3)

T(pΣ

Scalar

0 5 10 15 [GeV] T sum p

1

Ratio to CMS

2

0.5

2

0.5

1