right| (w.r.t. leading track) [rad] ϕ left|

0

0.2

0.4

0.6

0.8

1

1.2

1.4

〉ϕdη/d_T p^2d〈

ATLAS Herwig 7.2.1 default Pythia 8.170 default

900 GeV pp