(leading track) [GeV] Tp

0 0.5 ATLAS_2010_S8894728

> 0.1 GeV) T | < 2.5, p η (|

lead T ) vs p

T(pΣ

Average

2 4 6 8 10 (leading track) [GeV] Tp

1

Ratio to ATLAS

2

0.5

2

0.5

1