[GeV]

ell min Tp

3−10

2−10

1−10

1

[1/GeV]

ell min T /dp σ dσ1/

CMS Pythia 8.186 default

13000 GeV pp WW

mcplots.cern.ch [arXiv:1306.3436] Rivet 3.1.10, 400k events

CMS_2020_I1814328

(CMS W+W-)

l_Tp

50 100 150 [GeV]

ell min Tp

1

Ratio to CMS

2

0.5

2

0.5

1