(25/30/35/45/60) σ

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4

[pb] σd

CMS POWHEG BOX r3744 default

13000 GeV pp WW

mcplots.cern.ch [arXiv:1306.3436] Rivet 3.1.10, 2.4M events

CMS_2020_I1814328

(CMS W+W-)

Cross section

2 4 (25/30/35/45/60) σ

1

Ratio to CMS

2

0.5

2

0.5

1