ϕ dη/d_T

Mean p

0

0.5

1

1.5

2

2.5

3

3.5

-1 [GeV] T /d mean p ev dN ev 1/N

ATLAS Pythia 6.425 355 Pythia 6.425 356 Pythia 6.425 ambt1 Pythia 6.425 z2