[GeV] Z Tp

3−10

2−10

1−10

1

10

210

310

[fb/GeV] Z T /dp σd

CMS Pythia 6.427 359 Pythia 6.427 370 Pythia 6.427 a Pythia 6.427 dw Pythia 6.427 p0 Pythia 6.427 pro-q2o

13000 GeV pp Z+Jet

mcplots.cern.ch [arXiv:1306.3436] 300k events≥

Rivet 3.1.10,

CMS_2020_I1837084

)νν→ (CMS Z

ll_Tp

500 1000 1500 [GeV] Z Tp

1

Ratio to CMS

2

0.5

2

0.5

1