10

15

20

25

30

35

40 OPAL Herwig++ 2.7.1 default Herwig 7.2.1 default Herwig 7.2.1 softTune

91 GeV ee */Z (Hadronic) γ

mcplots.cern.ch [arXiv:1306.3436] 2.4M events ≥ Rivet 3.1.10,

OPAL_1992_I321190

> 100mm)

τ(c _{ch}

Average N

91 91.5

1

Ratio to OPAL

2

0.5

2

0.5

1