px

5−10

4−10

3−10

2−10

1−10 1 10 210 310 410

p /dx σ dσ1/

OPAL Herwig 7.2.1 default Pythia 8.308 default Sherpa 1.2.3 default Vincia 1.1.00_8.176 default

91 GeV ee */Z (Hadronic) γ

mcplots.cern.ch [arXiv:1306.3436] 400k events≥

Rivet 3.1.10,

OPAL_1998_S3780481

(OPAL c events)

Momentum Fraction

0 0.5 1 px

1

Ratio to OPAL

2

0.5

2

0.5

1