px

2−10

1−10

1

300k events ≥ Rivet 3.1.10,

SLD_2004_S5693039

, u,d,s-events) ±π( spectrum π

0 0.2 0.4 0.6 0.8 px

1

Ratio to SLD

2

0.5

2

0.5

1