* ϕ

1−10

1

10

210

310

410

[pb] * ϕ / d σd

LHCB

7000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:1306.3436]

(LHCB_2012_I1208102)

< 120) ee < 5, 60 < m η (e) > 20 GeV, 2 < T (ll) (p η * ϕ

0 0.5 1 1.5 2_* ϕ

1

Ratio to LHCB

2

0.5

2

0.5

1