η * ϕ

0

10000

20000

30000

40000

50000

[pb] η * ϕ/dσd

CMS Pythia 8.180 default Sherpa 2.2.9 default

13000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:1306.3436] 400k events≥

Rivet 3.1.10,

CMS_2019_I1753680

(ll) (CMS Z production) η * ϕ

3−10^{2−}10^{1−}10 1 10 η * ϕ

1

Ratio to CMS

2

0.5

2

0.5

1